spool ADEG_RU248.log

CREATE OR REPLACE TRIGGER T_SEQ_PITAGORA_OUT
BEFORE INSERT ON HZ_PITAGORA_OUT FOR EACH ROW
begin
  SELECT SEQ_PITAGORA_OUT.nextval INTO :new.UNIQUE_ID FROM dual;
end;
/

spool off