--da eseguire come utente DBCGO

---INSERT DBCGO_LOV PER SISTEMA MITTENTE MVNE
INSERT INTO DBCGO_LOV (LOV_ID, LOV_NAME, NAME, DESCR) 
		VALUES ( SEQ_LOV.NEXTVAL,'SIST_MITTENTE','MVNE','Mvne');
		

-- FILTRO OPERATORE VIRTUALE TISC
INSERT INTO DBCGO_LOV(LOV_ID, LOV_NAME, NAME, DESCR,ORDER_BY) VALUES (SEQ_LOV.nextval, 'OPERATORE_VIRTUALE', 'TISC', 'Tisc', 3);
		
COMMIT;


