--execute as DBC
spool /mnpapp/log/script/dbc_KS10_2014_Fase2.log;
-----------------------------

--CREATE/MODIFY OBJECT
-----------------------------
--INSERT/UPDATE DATA
@@dbcDML2.sql
-----------------------------
commit;
spool off;