UPDATE mnp_anag_finestre_temporali
SET
T_FINALE = '19:30:00',
T_FINALE_ACK = '19:45:00'
WHERE TIPO_FILE in ('1','9');
--aggiunta log systemcontroller fms
INSERT INTO MNP_ANAGRAFICA_PROCESSO (CODICE_PROCESSO,NOME_PROCESSO) VALUES ('FR', 'FmsRiskController');
INSERT INTO MNP_PROCESSO_LOG(CODICE_PROCESSO, CODICE_LOG, LOG_ON, TIPO_EVENTO)
SELECT 'FR', CODICE_LOG, 1, '00'
FROM MNP_ANAGRAFICA_LOG
WHERE CODICE_LOG LIKE '00%';
INSERT INTO MNP_PROCESSO_LOG(CODICE_PROCESSO, CODICE_LOG, LOG_ON, TIPO_EVENTO)
VALUES('FR', '9999', 1, '00');
--aggiunta log flusso fms
INSERT INTO MNP_ANAGRAFICA_PROCESSO (CODICE_PROCESSO,NOME_PROCESSO) VALUES ('FM', 'FmsRiskOut');
INSERT INTO MNP_PROCESSO_LOG(CODICE_PROCESSO, CODICE_LOG, LOG_ON, TIPO_EVENTO)
SELECT 'FM', CODICE_LOG, 1, '00'
FROM MNP_ANAGRAFICA_LOG
WHERE CODICE_LOG LIKE '00%';
INSERT INTO MNP_PROCESSO_LOG(CODICE_PROCESSO, CODICE_LOG, LOG_ON, TIPO_EVENTO)
VALUES('FM', '9999', 1, '00');
Insert into MNP_ANAGRAFICA_LOG
   (CODICE_LOG, SEVERITA, DESCRIZIONE)
 Values
   ('2604', 'N', 'CREAZIONE DEL FILE DI CESSAZIONI PER FMSRISK');
Insert into MNP_ANAGRAFICA_LOG
   (CODICE_LOG, SEVERITA, DESCRIZIONE)
 Values
   ('2605', 'C', 'ERRORE NELLA CREAZIONE DEL FILE DI CESSAZIONI PER FMSRISK');
INSERT INTO MNP_PROCESSO_LOG(CODICE_PROCESSO, CODICE_LOG, LOG_ON, TIPO_EVENTO)
VALUES('FM', '2604', 1, '00');
INSERT INTO MNP_PROCESSO_LOG(CODICE_PROCESSO, CODICE_LOG, LOG_ON, TIPO_EVENTO)
VALUES('FM', '2605', 1, '00');
COMMIT;