spool /mnpapp/log/script/SM_1582.log

alter table DWHT_VOLUMI_AOM0
modify (MSISDN varchar2(40), CODICE_OPERATORE varchar2(6));

alter table DWHT_VOLUMI_AOM1
modify (MSISDN varchar2(40), CODICE_OPERATORE varchar2(6));

spool off