CREATE TABLE "GNP"."GNP_DBCFXGO_OUT_NNG103"
   (	"UNIQUE_ID" NUMBER NOT NULL ENABLE,
	"DATA_CREAZIONE" DATE DEFAULT SYSDATE,
	"DA_SCODARE" NUMBER NOT NULL ENABLE,
	"ID_RICHIESTA" NUMBER NOT NULL ENABLE,
	"PROCESSO" VARCHAR2(25 BYTE) NOT NULL ENABLE,
	"TIPO_SERVIZIO" NUMBER(2,0),
	"TIPO_COMUNICAZIONE" NUMBER(2,0),
	"STATO_ORDINE" NUMBER(2,0),
	"ID_ESIGENZA" VARCHAR2(15 BYTE),
	"NNG" VARCHAR2(12 BYTE) NOT NULL ENABLE,
	"COR" VARCHAR2(3 BYTE),
	"COW" VARCHAR2(3 BYTE),
	"COD_FISCALE" VARCHAR2(16 BYTE),
	"PARTITA_IVA" VARCHAR2(11 BYTE),
	"DATA_ORDINE" DATE,
	"DATA_RICEZIONE_RICHIESTA" DATE,
	"DATA_ESPLETAMENTO" DATE,
	"NOME_FILE_FENP" VARCHAR2(50 BYTE),
	"CODICE_RIFIUTO_FENP" NUMBER(2,0),
	"CAUSALE_RIFIUTO_FENP" VARCHAR2(100 BYTE),
	"DAC" DATE,
	"RDAC" DATE,
	"CODICE_PROGETTO" VARCHAR2(18 BYTE),
	"CODICE_ORDINE" VARCHAR2(18 BYTE),
	 CONSTRAINT "GNP_DBCFXGO_OUT_NNG103_PK" PRIMARY KEY ("UNIQUE_ID")
  USING INDEX PCTFREE 10 INITRANS 2 MAXTRANS 255
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "GNP_DATA_SMALL"  ENABLE
   ) SEGMENT CREATION IMMEDIATE
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255
 NOCOMPRESS LOGGING
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "GNP_DATA_BIG" ;

  CREATE INDEX "GNP"."IDX_GNP_DBCFXGO_OUT_NNG103_01" ON "GNP"."GNP_DBCFXGO_OUT_NNG103" ("ID_RICHIESTA")
  PCTFREE 10 INITRANS 2 MAXTRANS 255 COMPUTE STATISTICS
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "GNP_IDX_SMALL" ;

  CREATE INDEX "GNP"."IDX_GNP_DBCFXGO_OUT_NNG103_02" ON "GNP"."GNP_DBCFXGO_OUT_NNG103" ("ID_ESIGENZA")
  PCTFREE 10 INITRANS 2 MAXTRANS 255 COMPUTE STATISTICS
  STORAGE(INITIAL 65536 NEXT 1048576 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "GNP_IDX_SMALL" ;
