
  CREATE TABLE "GNP"."GNP_NOW_D82_RICHIESTE_IN"
   (	"UNIQUE_ID" NUMBER NOT NULL ENABLE,
	"DA_SCODARE" NUMBER(1,0) DEFAULT 0 NOT NULL ENABLE,
	"DATA_RICEZIONE" DATE DEFAULT SYSDATE,
	"ID_NOTIFICA" VARCHAR2(255 BYTE),
	"ID_RICHIESTA_D82" NUMBER,
	"TIPO_NOTIFICA" VARCHAR2(5 BYTE) NOT NULL ENABLE,
	"TIPO_EVENTO" VARCHAR2(20 BYTE),
	"CODICE_OPERATORE_RECIPIENT" VARCHAR2(3 BYTE) NOT NULL ENABLE,
	"CODICE_OPERATORE_WHS" VARCHAR2(3 BYTE) NOT NULL ENABLE,
	"CODICE_ORDINE_WHS" VARCHAR2(31 BYTE),
	"CODICE_SESSIONE" VARCHAR2(50 BYTE),
	"CODICE_RISORSA" VARCHAR2(12 BYTE),
	"NP_DN1" VARCHAR2(12 BYTE),
	"NP_DN2" VARCHAR2(12 BYTE),
	"NP_DN3" VARCHAR2(12 BYTE),
	"NP_DN4" VARCHAR2(12 BYTE),
	"NP_DN5" VARCHAR2(12 BYTE),
	"NP_DN6" VARCHAR2(12 BYTE),
	"NP_DN7" VARCHAR2(12 BYTE),
	"NP_DN8" VARCHAR2(12 BYTE),
	"NP_DN9" VARCHAR2(12 BYTE),
	"NP_DN10" VARCHAR2(12 BYTE),
	"DATA_DAC" DATE,
	"DATA_ESPLETAMENTO" DATE,
	"DATA_NOTIFICA" DATE,
	"NOTE" VARCHAR2(255 BYTE),
	 CONSTRAINT "PK_GNP_NOW_D82_RICHIESTE_IN" PRIMARY KEY ("UNIQUE_ID")
  USING INDEX PCTFREE 10 INITRANS 2 MAXTRANS 255
  STORAGE(INITIAL 131072 NEXT 131072 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "GNP_IDX_SMALL"  ENABLE
   ) SEGMENT CREATION IMMEDIATE
  PCTFREE 10 PCTUSED 40 INITRANS 1 MAXTRANS 255
 NOCOMPRESS LOGGING
  STORAGE(INITIAL 131072 NEXT 131072 MINEXTENTS 1 MAXEXTENTS 2147483645
  PCTINCREASE 0 FREELISTS 1 FREELIST GROUPS 1
  BUFFER_POOL DEFAULT FLASH_CACHE DEFAULT CELL_FLASH_CACHE DEFAULT)
  TABLESPACE "GNP_DATA_SMALL" ;
